import { LoadingFade } from "@/components/transitions/LoadingFade";

/**
 * Admin shell loading state.
 *
 * Replaces the previous skeleton (header + 4 stat cards + 2 panels +
 * 5-row table) with a 1px-thick animated bar at the top of the page.
 * The AdminSidebar and parchment background stay mounted, so the
 * transition is a subtle fade — the user never sees an "empty" version
 * of the admin while the next page streams in.
 */
export default function AdminLoading() {
  return <LoadingFade />;
}
