-- 0002_admin_password.sql (no-op)
--
-- This migration slot is preserved for historical DB compatibility.
-- The original content added a `password_hash` column to a legacy `users`
-- table used by the old Auth.js Credentials provider. That table no longer
-- exists — auth moved to Neon Auth (Better Auth), which manages its own
-- `neon_auth.user` schema. See CLAUDE.md "Authentication & Authorization".
--
-- Production DBs that ran the original migration already have this filename
-- recorded in `_migrations` and will skip it. Fresh DBs would otherwise
-- fail on `ALTER TABLE users`; this no-op keeps the apply path clean while
-- preserving the migration numbering (0003_*.sql onward is unaffected).
--
-- Do not reintroduce an `ALTER TABLE users` here — the table does not exist
-- and Neon Auth owns user identity.

SELECT 1;